USE `data_center_aeon_admin`;

ALTER TABLE `basic_monitoring_asset` ADD (
    `class_big` varchar(255) DEFAULT NULL,
    `class_medium` varchar(255) DEFAULT NULL,
    `class_small` varchar(255) DEFAULT NULL,
    `symbol` varchar(255) DEFAULT NULL,
    `manufacturer` varchar(255) DEFAULT NULL,
    `model` varchar(255) DEFAULT NULL,
    `manufacturing_date` varchar(255) DEFAULT NULL,
    `specifications1` varchar(255) DEFAULT NULL,
    `specifications2` varchar(255) DEFAULT NULL,
    `specifications3` varchar(255) DEFAULT NULL,
    `specifications4` varchar(255) DEFAULT NULL,
    `specifications5` varchar(255) DEFAULT NULL,
    `specifications6` varchar(255) DEFAULT NULL
)