/*
SQLyog 企业版 - MySQL GUI v8.14 
MySQL - 8.0.28 : Database - data_center_new
*********************************************************************
*/


/*!40101 SET NAMES utf8 */;

/*!40101 SET SQL_MODE=''*/;

/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;
CREATE DATABASE /*!32312 IF NOT EXISTS*/`data_center_new` /*!40100 DEFAULT CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci */ /*!80016 DEFAULT ENCRYPTION='N' */;

USE `data_center_new`;

/*Table structure for table `basic_company` */

DROP TABLE IF EXISTS `basic_company`;

CREATE TABLE `basic_company` (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `parent_id` bigint DEFAULT NULL,
  `company_name` varchar(500) DEFAULT NULL,
  `mfa_switch` int DEFAULT '0' COMMENT '谷歌mfa服务开关。0-关闭，1-开启',
  `flag` int DEFAULT '0' COMMENT '0-正常，1-删除',
  `create_time` bigint DEFAULT NULL,
  `modify_time` bigint DEFAULT NULL,
  `apikey` varchar(255) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

/*Data for the table `basic_company` */

insert  into `basic_company`(`id`,`parent_id`,`company_name`,`mfa_switch`,`flag`,`create_time`,`modify_time`) values (1,-1,'MiniSolution',0,0,1658978002231,1658978002231);

/*Table structure for table `basic_menu` */

DROP TABLE IF EXISTS `basic_menu`;

CREATE TABLE `basic_menu` (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `parent_menu_id` bigint DEFAULT NULL,
  `menu_name` varchar(100) DEFAULT NULL,
  `menu_name_en` varchar(100) DEFAULT NULL,
  `menu_name_jp` varchar(100) DEFAULT NULL,
  `remark` varchar(100) DEFAULT NULL,
  `menu_level` int DEFAULT '1' COMMENT '菜单级别',
  `flag` int DEFAULT '0' COMMENT '0-正常，1-删除',
  `create_time` bigint DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

/*Data for the table `basic_menu` */

insert  into `basic_menu`(`id`,`parent_menu_id`,`menu_name`,`menu_name_en`,`menu_name_jp`,`remark`,`menu_level`,`flag`,`create_time`) values (1,-1,'项目管理','项目管理','项目管理','项目管理',1,0,1659079777164),(2,-1,'楼宇模块','楼宇模块','楼宇模块','楼宇模块',1,0,1659079777164),(3,-1,'设备模块','设备模块','设备模块','设备模块',1,0,1659079777164),(4,-1,'转发管理','转发管理','转发管理','转发管理',1,0,1659079777164),(5,-1,'数据来源管理','数据来源管理','数据来源管理','数据来源管理',1,0,1659079777164),(6,1,'添加','添加','添加','项目管理-添加',2,0,1659079777164),(7,1,'编辑','编辑','编辑','项目管理-编辑',2,0,1659079777164),(8,1,'删除','删除','删除','项目管理-删除',2,0,1659079777164),(9,1,'批量添加','批量添加','批量添加','项目管理-批量添加',2,0,1659079777164),(10,2,'楼宇管理','楼宇管理','楼宇管理','楼宇管理',2,0,1659079777164),(11,2,'楼层管理','楼层管理','楼层管理','楼层管理',2,0,1659079777164),(12,2,'房间管理','房间管理','房间管理','房间管理',2,0,1659079777164),(13,2,'资产管理','资产管理','资产管理','资产管理',2,0,1659079777164),(14,10,'添加','添加','添加','楼宇管理-添加',3,0,1659079777164),(15,10,'编辑','编辑','编辑','楼宇管理-编辑',3,0,1659079777164),(16,10,'删除','删除','删除','楼宇管理-删除',3,0,1659079777164),(17,11,'添加','添加','添加','楼层管理-添加',3,0,1659079777164),(18,11,'编辑','编辑','编辑','楼层管理-编辑',3,0,1659079777164),(19,11,'删除','删除','删除','楼层管理-删除',3,0,1659079777164),(20,12,'添加','添加','添加','房间管理-添加',3,0,1659079777164),(21,12,'编辑','编辑','编辑','房间管理-编辑',3,0,1659079777164),(22,12,'删除','删除','删除','房间管理-删除',3,0,1659079777164),(23,13,'添加','添加','添加','资产管理-添加',3,0,1659079777164),(24,13,'编辑','编辑','编辑','资产管理-编辑',3,0,1659079777164),(25,13,'删除','删除','删除','资产管理-删除',3,0,1659079777164),(26,3,'设备管理','设备管理','设备管理','设备管理',2,0,1659079777164),(27,26,'添加','添加','添加','设备管理-添加',3,0,1659079777164),(28,26,'编辑','编辑','编辑','设备管理-编辑',3,0,1659079777164),(29,26,'删除','删除','删除','设备管理-删除',3,0,1659079777164),(30,26,'批量添加','批量添加','批量添加','设备管理-批量添加',3,0,1659079777164),(31,26,'批量删除','批量删除','批量删除','设备管理-批量删除',3,0,1659079777164),(32,3,'设备类别管理','设备类别管理','设备类别管理','设备类别管理',2,0,1659079777164),(33,32,'添加','添加','添加','设备类别管理-添加',3,0,1659079777164),(34,32,'编辑','编辑','编辑','设备类别管理-编辑',3,0,1659079777164),(35,32,'删除','删除','删除','设备类别管理-删除',3,0,1659079777164),(36,4,'添加','添加','添加','转发管理-添加',3,0,1659079777164),(37,4,'编辑','编辑','编辑','转发管理-编辑',3,0,1659079777164),(38,4,'删除','删除','删除','转发管理-删除',3,0,1659079777164),(39,5,'添加','添加','添加','数据来源管理-添加',3,0,1659079777164),(40,5,'编辑','编辑','编辑','数据来源管理-编辑',3,0,1659079777164),(41,5,'删除','删除','删除','数据来源管理-删除',3,0,1659079777164);

/*Table structure for table `basic_role` */

DROP TABLE IF EXISTS `basic_role`;

CREATE TABLE `basic_role` (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `company_id` bigint DEFAULT NULL,
  `role_name` varchar(100) DEFAULT NULL,
  `description` varchar(500) DEFAULT NULL,
  `flag` int DEFAULT '0' COMMENT '0-正常，1-删除',
  `creator_id` bigint DEFAULT NULL,
  `create_time` bigint DEFAULT NULL,
  `modifier_id` bigint DEFAULT NULL,
  `modify_time` bigint DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

/*Table structure for table `basic_role_menu_relation` */

DROP TABLE IF EXISTS `basic_role_menu_relation`;

CREATE TABLE `basic_role_menu_relation` (
  `role_id` bigint DEFAULT NULL,
  `menu_id` bigint DEFAULT NULL,
  `creator_id` bigint DEFAULT NULL,
  `create_time` bigint DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

/*Table structure for table `basic_role_user_relation` */

DROP TABLE IF EXISTS `basic_role_user_relation`;

CREATE TABLE `basic_role_user_relation` (
  `user_id` bigint DEFAULT NULL,
  `role_id` bigint DEFAULT NULL,
  `creator_id` bigint DEFAULT NULL,
  `create_time` bigint DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

/*Table structure for table `basic_user` */

DROP TABLE IF EXISTS `basic_user`;

CREATE TABLE `basic_user` (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `user_type` int DEFAULT '0' COMMENT '0-未知，1-管理平台用户，2-普通平台用户',
  `company_id` bigint NOT NULL,
  `username` varchar(255) DEFAULT NULL,
  `login_name` varchar(255) DEFAULT NULL,
  `password` varchar(255) DEFAULT NULL,
  `password_modify_time` bigint DEFAULT NULL,
  `salt` varchar(255) DEFAULT NULL,
  `email` varchar(255) DEFAULT NULL,
  `mobile_number` varchar(255) DEFAULT NULL,
  `mfa_secret` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci DEFAULT NULL,
  `mfa_bind` int DEFAULT '0' COMMENT '用户是否绑定了mfa设备。0-未绑定，1-已绑定',
  `last_login_time` bigint DEFAULT NULL,
  `flag` int NOT NULL DEFAULT '0' COMMENT '0-正常，1-删除',
  `expire_time` bigint DEFAULT '4114487556000',
  `create_time` bigint DEFAULT NULL,
  `creator_id` bigint DEFAULT NULL,
  `modify_time` bigint DEFAULT NULL,
  `modifier_id` bigint DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

/*Data for the table `basic_user` */

insert  into `basic_user`(`id`,`user_type`,`company_id`,`username`,`login_name`,`password`,`password_modify_time`,`salt`,`email`,`mobile_number`,`mfa_secret`,`mfa_bind`,`last_login_time`,`flag`,`expire_time`,`create_time`,`creator_id`,`modify_time`,`modifier_id`) values (1,1,1,'admin','admin','nVg+buw0YAs=',1670312031273,'09bc3a7898','1053492832@qq.com',NULL,NULL,0,1706177793183,0,4114487556000,4114487556000,NULL,1670312031273,NULL);

/*Table structure for table `login_history` */

DROP TABLE IF EXISTS `login_history`;

CREATE TABLE `login_history` (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `user_id` bigint DEFAULT NULL,
  `request_ip` varchar(255) DEFAULT NULL,
  `login_time` bigint DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

/*Table structure for table `worker_node` */

DROP TABLE IF EXISTS `worker_node`;

CREATE TABLE `worker_node` (
  `ID` bigint NOT NULL AUTO_INCREMENT COMMENT 'auto increment id',
  `HOST_NAME` varchar(64) COLLATE utf8mb4_unicode_ci NOT NULL COMMENT 'host name',
  `PORT` varchar(64) COLLATE utf8mb4_unicode_ci NOT NULL COMMENT 'port',
  `TYPE` int NOT NULL COMMENT 'node type: ACTUAL or CONTAINER',
  `LAUNCH_DATE` date NOT NULL COMMENT 'launch date',
  `MODIFIED` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT 'modified time',
  `CREATED` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT 'created time',
  PRIMARY KEY (`ID`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='DB WorkerID Assigner for UID Generator';

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;
